0˚ 10˚ 20˚ 30˚ 40˚ 35˚

40˚

45˚

50˚

55˚

60˚

65˚

70˚

10˚ 20˚ 30˚

80˚

Vertical 5.0 mm/yr

Model: Milne (2000)